From a79dffbbfa842a9680deacbcca9dab2ec958b678 Mon Sep 17 00:00:00 2001
From: xXJsonDeruloXx <danielhimebauch@gmail.com>
Date: Fri, 7 Aug 2026 00:09:36 -0400
Subject: fix: keep 1x multiplier label as off

---
 src/components/FpsMultiplierControl.tsx | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'src/components/FpsMultiplierControl.tsx')

diff --git a/src/components/FpsMultiplierControl.tsx b/src/components/FpsMultiplierControl.tsx
index b9a0f80..206643e 100644
--- a/src/components/FpsMultiplierControl.tsx
+++ b/src/components/FpsMultiplierControl.tsx
@@ -1,6 +1,7 @@
 import { PanelSectionRow, DialogButton, Focusable } from "@decky/ui";
 import { ConfigurationData } from "../config/configSchema";
 import { MULTIPLIER } from "../config/generatedConfigSchema";
+import t from '../i18n/i18n';
 
 interface FpsMultiplierControlProps {
   config: ConfigurationData;
@@ -49,7 +50,7 @@ export function FpsMultiplierControl({
             textAlign: "center"
           }}
         >
-          {`${config.multiplier}X`}
+          {config.multiplier < 2 ? t('MULTIPLIER_OFF', 'OFF') : `${config.multiplier}X`}
         </div>
         <DialogButton
           style={{
-- 
cgit v1.2.3

