From 2d718e686431b05e0767b1bd1efa1584487998d0 Mon Sep 17 00:00:00 2001
From: xXJSONDeruloXx <danielhimebauch@gmail.com>
Date: Mon, 20 Oct 2025 11:15:23 -0400
Subject: feat: always set no_fp16 false even on previous conf

---
 src/components/ConfigurationSection.tsx | 11 +----------
 1 file changed, 1 insertion(+), 10 deletions(-)

(limited to 'src/components/ConfigurationSection.tsx')

diff --git a/src/components/ConfigurationSection.tsx b/src/components/ConfigurationSection.tsx
index 9afc650..b098b32 100644
--- a/src/components/ConfigurationSection.tsx
+++ b/src/components/ConfigurationSection.tsx
@@ -4,7 +4,7 @@ import { RiArrowDownSFill, RiArrowUpSFill } from "react-icons/ri";
 import { ConfigurationData } from "../config/configSchema";
 import { FpsMultiplierControl } from "./FpsMultiplierControl";
 import {
-  NO_FP16, FLOW_SCALE, PERFORMANCE_MODE, HDR_MODE,
+  FLOW_SCALE, PERFORMANCE_MODE, HDR_MODE,
   EXPERIMENTAL_PRESENT_MODE, DXVK_FRAME_RATE, DISABLE_STEAMDECK_MODE,
   MANGOHUD_WORKAROUND, DISABLE_VKBASALT, FORCE_ENABLE_VKBASALT, ENABLE_WSI, ENABLE_ZINK
 } from "../config/generatedConfigSchema";
@@ -97,15 +97,6 @@ export function ConfigurationSection({
         />
       </PanelSectionRow>
 
-      <PanelSectionRow>
-        <ToggleField
-          label="Force Disable FP16"
-          description="Force-disable FP16 acceleration"
-          checked={config.no_fp16}
-          onChange={(value) => onConfigChange(NO_FP16, value)}
-        />
-      </PanelSectionRow>
-
       <PanelSectionRow>
         <ToggleField
           label="HDR Mode"
-- 
cgit v1.2.3

