From 598931c87995a9e2f3af045ca51c736729ae5197 Mon Sep 17 00:00:00 2001
From: xXJsonDeruloXx <danielhimebauch@gmail.com>
Date: Thu, 6 Aug 2026 21:26:40 -0400
Subject: fix: expose runtime 1x passthrough in Decky

---
 src/components/ConfigurationSection.tsx | 11 +----------
 1 file changed, 1 insertion(+), 10 deletions(-)

(limited to 'src/components/ConfigurationSection.tsx')

diff --git a/src/components/ConfigurationSection.tsx b/src/components/ConfigurationSection.tsx
index 538975e..f332ad2 100644
--- a/src/components/ConfigurationSection.tsx
+++ b/src/components/ConfigurationSection.tsx
@@ -3,7 +3,7 @@ import { useState, useEffect } from "react";
 import { RiArrowDownSFill, RiArrowUpSFill } from "react-icons/ri";
 import { ConfigurationData } from "../config/configSchema";
 import {
-  ACTIVE_IN, ALLOW_FP16, DISABLE_LSFGVK, DLL, FLOW_SCALE, GPU,
+  ACTIVE_IN, ALLOW_FP16, DLL, FLOW_SCALE, GPU,
   PERFORMANCE_MODE, USE_NATIVE_MATCHING, DXVK_FRAME_RATE, DISABLE_STEAMDECK_MODE,
   MANGOHUD_WORKAROUND, DISABLE_VKBASALT, FORCE_ENABLE_VKBASALT, ENABLE_WSI, ENABLE_ZINK
 } from "../config/generatedConfigSchema";
@@ -134,15 +134,6 @@ export function ConfigurationSection({
             />
           </PanelSectionRow>
 
-          <PanelSectionRow>
-            <ToggleField
-              label="Disable Frame Generation"
-              description="Disables lsfg-vk on the next game launch. Requires a game restart."
-              checked={config.disable_lsfgvk}
-              onChange={(value) => onConfigChange(DISABLE_LSFGVK, value)}
-            />
-          </PanelSectionRow>
-
           <PanelSectionRow>
             <ToggleField
               label="Allow FP16"
-- 
cgit v1.2.3

