From ca74bc1dcf2a782d6937810858b5d64e3e3d2917 Mon Sep 17 00:00:00 2001
From: xXJsonDeruloXx <danielhimebauch@gmail.com>
Date: Sun, 31 May 2026 12:16:47 -0400
Subject: fix: stack dropdown controls

---
 src/components/OptiScalerControls.tsx | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'src/components/OptiScalerControls.tsx')

diff --git a/src/components/OptiScalerControls.tsx b/src/components/OptiScalerControls.tsx
index 2167fcd..a8b0863 100644
--- a/src/components/OptiScalerControls.tsx
+++ b/src/components/OptiScalerControls.tsx
@@ -126,6 +126,7 @@ export function OptiScalerControls({ pathExists, setPathExists, fgmodInfo }: Opt
 
       <PanelSectionRow>
         <DropdownItem
+          layout="below"
           label="Default FSR4 runtime"
           description={FSR4_VARIANT_OPTIONS.find((option) => option.value === fsr4Variant)?.hint}
           menuLabel="Default FSR4 runtime"
@@ -149,6 +150,7 @@ export function OptiScalerControls({ pathExists, setPathExists, fgmodInfo }: Opt
       {pathExists === true && (
         <PanelSectionRow>
           <DropdownItem
+            layout="below"
             label="Proxy DLL name"
             description={PROXY_DLL_OPTIONS.find((o) => o.value === dllName)?.hint}
             menuLabel="Proxy DLL name"
-- 
cgit v1.2.3

