From b72b32761058767d143e9ff08dc238c5ac9b777c Mon Sep 17 00:00:00 2001
From: AAGaming <aa@mail.catvibers.me>
Date: Sat, 7 Jan 2023 20:33:28 -0500
Subject: Fix reloading UI on updates and restarting steam (#303)

---
 frontend/src/tabs-hook.tsx | 1 -
 1 file changed, 1 deletion(-)

(limited to 'frontend/src/tabs-hook.tsx')

diff --git a/frontend/src/tabs-hook.tsx b/frontend/src/tabs-hook.tsx
index 00adf206..d9c76ca6 100644
--- a/frontend/src/tabs-hook.tsx
+++ b/frontend/src/tabs-hook.tsx
@@ -7,7 +7,6 @@ import Logger from './logger';
 declare global {
   interface Window {
     __TABS_HOOK_INSTANCE: any;
-    securitystore: any;
   }
 }
 
-- 
cgit v1.2.3

