From eb439574becb9a82c283d513a98440d7c8efbafe Mon Sep 17 00:00:00 2001
From: TrainDoctor <traindoctor@protonmail.com>
Date: Thu, 1 Sep 2022 13:46:49 -0700
Subject: Addition of proper branch slection (#168)

* This is a bit better, but branch selection still isn't working -_-

* I'm the king of oversight

* Selecting different branch checks for updates

* Stable doesn't detect old versions, which indicates it doesn't work

* Start adding deckyState for plugin updating

* Few tweaks

* Disable nightly selection

* Update decky-frontend-lib and move useSetting set setting to async
---
 frontend/src/components/settings/pages/general/index.tsx | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'frontend/src/components/settings/pages/general/index.tsx')

diff --git a/frontend/src/components/settings/pages/general/index.tsx b/frontend/src/components/settings/pages/general/index.tsx
index c5f9b9dc..a37d8dab 100644
--- a/frontend/src/components/settings/pages/general/index.tsx
+++ b/frontend/src/components/settings/pages/general/index.tsx
@@ -3,7 +3,7 @@ import { useState } from 'react';
 import { FaShapes } from 'react-icons/fa';
 
 import { installFromURL } from '../../../../store';
-// import BranchSelect from './BranchSelect';
+import BranchSelect from './BranchSelect';
 import RemoteDebuggingSettings from './RemoteDebugging';
 import UpdaterSettings from './Updater';
 
@@ -22,7 +22,7 @@ export default function GeneralSettings() {
         />
       </Field> */}
       <UpdaterSettings />
-      {/* <BranchSelect /> */}
+      <BranchSelect />
       <RemoteDebuggingSettings />
       <Field
         label="Manual plugin install"
-- 
cgit v1.2.3

