From ede1067bb38989152cbd22729231fdd2c50041fd Mon Sep 17 00:00:00 2001
From: Marco Rodolfi <marco.rodolfi@tuta.io>
Date: Sun, 21 May 2023 00:07:59 +0200
Subject: [Hotfix] Wrong key name interpreted as plural (#459)

---
 frontend/src/components/settings/pages/developer/index.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'frontend/src/components/settings/pages/developer/index.tsx')

diff --git a/frontend/src/components/settings/pages/developer/index.tsx b/frontend/src/components/settings/pages/developer/index.tsx
index 7a62c052..774bb449 100644
--- a/frontend/src/components/settings/pages/developer/index.tsx
+++ b/frontend/src/components/settings/pages/developer/index.tsx
@@ -74,7 +74,7 @@ export default function DeveloperSettings() {
         </Field>
       </DialogControlsSection>
       <DialogControlsSection>
-        <DialogControlsSectionHeader>{t('SettingsDeveloperIndex.header_other')}</DialogControlsSectionHeader>
+        <DialogControlsSectionHeader>{t('SettingsDeveloperIndex.header')}</DialogControlsSectionHeader>
         <RemoteDebuggingSettings />
         <Field
           label={t('SettingsDeveloperIndex.valve_internal.label')}
-- 
cgit v1.2.3

